timelapse mode indication of the time remaining

The timelapse mode gives some weird and uninformative indication of the time remaining (or at least it does not make intuitive sense).

https://www.dropbox.com/scl/fi/bpasgoyx ... yvdix&dl=0

In the example above, I had set a series of three shots of 40 seconds each, with a 42 second interval. So the whole thing should take 42+42+40=124 seconds (2 minutes and 4 seconds).

The time indicated for the whole sequence is 2:00+m. Not sure what m means (minutes?) but that seems close enough. But during the last shot, instead of saying 40 seconds left and then counting down to 0, it just says "0+y remaining." What is y?

Anyway, it's not a big problem and certainly is not hampering usability of the device. But I would love to understand better.

Thanks again!

Best,

Pierre
Statistics: Posted by pazoulay — February 23rd, 2024, 1:25 pm